Super Ensemble #

Bin #

U-err std: 0.030

200 400 600 800

-15 -10 -5 0 5 10 15 20 -0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06

0.08

-0.04 -0.02 0 0.02 0.04 -15 -10 -5 0 5 10 15 20

Residual [m/s] mean(U-err)

Ensemble #

Depth [m]

U_{oce}

200 400 600 800

0 500 1000 1500 2000 2500 3000 3500 4000 4500 -0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4

Super Ensemble #

V-err std: 0.030

200 400 600 800

-15 -10 -5 0 5 10 15 20 -0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06

0.08

-0.04 -0.02 0 0.02 0.04 -15 -10 -5 0 5 10 15 20

Residual [m/s] mean(V-err)

-0.20

0.2 A13.5 (2010) two-head station #122, cast #01 Figure 3

Ensemble #

U_{oce}

200 400 600 800

0 500 1000 1500 2000 2500 3000 3500 4000 4500