1000 2000 3000 4000 5000 6000 7000

-0.1

-0.05

0

0.05

0.1 U offset [m/s]

1000 2000 3000 4000 5000 6000 7000

-0.1

-0.05

0

0.05

0.1 V offset [m/s]

A16N_2013 cast #61 down+up Figure 10

1000 2000 3000 4000 5000 6000 7000 0 0.5 1 1.5 2 2.5 3 Tilt error [degree] consistent with offset