Depth [m]

Super Ensemble #

U-err std: 0.028

2004006008001000

0

1000

2000

3000

4000

5000 -0.06

-0.04

-0.02 0 0.02

0.04

0.06

-0.04 -0.02 0 0.02 0.04 -20 -18 -16 -14 -12 -10 -8 -6 -4 -2 median(U-err)

Residual [m/s]

Bin #

Ensemble #

U_{oce}

2004006008001000

0

1000

2000

3000

4000

5000 -0.3

-0.2

-0.1 0 0.1 0.2 0.3

Super Ensemble #

V-err std: 0.027

2004006008001000

0

1000

2000

3000

4000

5000 -0.06

-0.04

-0.02 0 0.02

0.04

0.06

-0.04 -0.02 0 0.02 0.04 -20 -18 -16 -14 -12 -10 -8 -6 -4 -2 median(V-err)

Residual [m/s]

-0.20.2

A16N_2013 cast #144 Figure 3

Ensemble #

V_{oce}

2004006008001000

0

1000

2000

3000

4000

5000