Depth [m]

Super Ensemble #

U-err std: 0.054

5 10 15 20 25

0 20 40 60 80 100 120 140 160 -0.15

-0.1

-0.05 0 0.05 0.1 0.15

-0.04 -0.02 0 0.02 0.04 -40 -35 -30 -25 -20 -15 -10 -5 median(U-err)

Residual [m/s]

Bin #

Ensemble #

U_{oce}

5 10 15 20 25

0 20 40 60 80 100 120 140 160 180 -0.2

-0.1

0

0.1

0.2

Super Ensemble #

V-err std: 0.049

5 10 15 20 25

0 20 40 60 80 100 120 140 160 -0.1

-0.05

0

0.05

0.1

-0.04 -0.02 0 0.02 0.04 -40 -35 -30 -25 -20 -15 -10 -5 median(V-err)

Residual [m/s]

-0.20

0.2 A16S_2013-2014 cast #101 Figure 3

Ensemble #

V_{oce}

5 10 15 20 25

0 20 40 60 80 100 120 140 160 180