500 1000 1500 2000 2500 3000 3500 4000

-0.1

0

0.1 U offset [m/s]

500 1000 1500 2000 2500 3000 3500 4000

-0.1

0

0.1 V offset [m/s]

A20-030

500 1000 1500 2000 2500 3000 3500 4000 0 1 2 3 Tilt error [degree] consistent with offset