0 100 200 300 400

-200

-150

-100

-50

0 start depth (.red) (.blue) Surface distance

time in ensembles depth in meter

8500 9000 9500

-200

-150

-100

-50

0 end depth

time in ensembles

A20-068

3600 3650 3700 3750 3800 3850 3900 3950 4000

-4650

-4600

-4550

-4500 bottom depth (-red) CTD depth (.blue) bottom distance

time in ensembles