-0.05

0

0.05

50 100 150 200 250 -16 -14 -12 -10 -8 -6 -4 -2 bins

U-err std:0.017367

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

50 100 150 200 250

-2500

-2000

-1500

-1000

-500

U_{oce}

-0.2 -0.1 0 0.1

-2500

-2000

-1500

-1000

-500

U

-0.05

0

0.05

50 100 150 200 250 -16 -14 -12 -10 -8 -6 -4 -2

super ensemble

V-err std:0.018428

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15

50 100 150 200 250

-2500

-2000

-1500

-1000

-500

super ensemble

V_{oce}

-0.2 -0.1 0 0.1

-2500

-2000

-1500

-1000

-500

V

velocity [m/s]