0 1 2 3

-3000

-2500

-2000

-1500

-1000

-500

Time in hours

CTD pressure [dBar]

Cut CTD profile

10 20 30 40 50 -1.5 -1 -0.5 0 0.5 1 1.5 sample scans (b)ADCP (r)CTD

W used for lag correlation best lag W: 22 scans ~ -11 sec. c:0.99062 down cast up cast

200 400 600 800 -200

-150

-100

-50

0 start depth (.red) (.blue) Surface distance time in ensembles depth in meter

7700 7800 7900 8000 8100

-150

-100

-50

0 end depth time in ensembles

056^03 Figure 4

3850 3900 3950 4000 4050 4100 4150 4200 4250 4300

-3150

-3100

-3050

-3000 bottom (--k) LADCP depth (-k) bottom distance (.b) time in ensembles

bottom at: 3191 [m] ADCP was 9 m above bottom