Super Ensemble #

Bin #

U-err std: 0.022

100 200 300

5 10 15 20 25 30 -0.06

-0.04

-0.02 0 0.02

0.04

0.06

-0.04 -0.02 0 0.02 0.04

5 10 15 20 25 30

Residual [m/s] mean(U-err)

Ensemble #

Depth [m]

U_{oce}

100 200 300

0 200 400 600 800 1000 1200 1400 1600 1800 -0.3

-0.2

-0.1 0 0.1 0.2 0.3

Super Ensemble #

V-err std: 0.022

100 200 300

5 10 15 20 25 30 -0.06

-0.04

-0.02 0 0.02

0.04

0.06

-0.04 -0.02 0 0.02 0.04

5 10 15 20 25 30

Residual [m/s] mean(V-err)

-0.20

0.2 I5S 2009 cast #130 Figure 3

Ensemble #

U_{oce}

100 200 300

0 200 400 600 800 1000 1200 1400 1600 1800