-1 0 1

I5S 2009 cast #174 Figure 2

ensemble range [m]

W as function of bindepth and time

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000

50 100 150 200 250

18 20 22 24

-250

-200

-150

-100 -50

100% 99% 96% 94% distance [m] echo amplidute [dB]

Beam Performance

0 50 100

-250

-200

-150

-100 -50

220 228 220 212

#NaN range:

correlation

Range of good data

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000

-5000

0 depth

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000 0 10 20 30 tilt [deg]

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000 0 90 180 270 360 heading [deg]

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000 135 140 145 mean: 139.5

X-mit volt down ensemble