0 1 2 3

-3500

-3000

-2500

-2000

-1500

-1000

-500 0

Time in hours

CTD pressure [dBar]

Cut CTD profile

10 20 30 40 50 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 sample scans (b)ADCP (r)CTD

W used for lag correlation best lag W: 0 scans ~ 0 sec. c:1

022.01 Figure 4

240 260 280 300 320 340 360 -3350

-3300

-3250

-3200

-3150

-3100