P6 (2009-10) stn #121, cast #2 Figure 11

Battery Voltage is 45.8 V

LADCP WARNINGS increased error because of shear - inverse difference

LADCP processing warnings: large U bottom track bias -99.6727 large V bottom track bias 247.0506