Super Ensemble #

Bin #

U-err std: 149332630842402.438

200 400 600 8001000

2 4 6 8 10 12 14 16 18 20 -3 -2 -1 0 1 2 3 x 10^{14}

-0.04 -0.02 0 0.02 0.04 2 4 6 8 10 12 14 16 18 20

Residual [m/s] mean(U-err)

Ensemble #

Depth [m]

U_{oce}

2004006008001000

0

1000

2000

3000

4000

5000 -8 -6 -4 -2 0 2 4 6 8 x 10^{16}

Super Ensemble #

V-err std: 224267919072050.875

200 400 600 8001000

2 4 6 8 10 12 14 16 18 20 -4 -3 -2 -1 0 1 2 3 4 x 10^{14}

-0.04 -0.02 0 0.02 0.04 2 4 6 8 10 12 14 16 18 20

Residual [m/s] mean(V-err)

-50 5 x 10^{16} P6 (2009-10) stn #126, cast #1 Figure 3

Ensemble #

U_{oce}

2004006008001000

0

1000

2000

3000

4000

5000