200 400 600 800 1000 1200 1400

-0.1

-0.05

0

0.05

0.1 U offset [m/s]

200 400 600 800 1000 1200 1400

-0.1

-0.05

0

0.05

0.1 V offset [m/s]

S4P (2011) Dual -- Station #2, cast #01 Figure 10

200 400 600 800 1000 1200 1400 0 1 2 3 4 5 Tilt error [degree] consistent with offset