-6

-5

-4

-3

-2

-1

0

Depth (km)

0 5 10 15 20 SST (^oC) np9603, section (c), 35-95 m

11^oE 15^oE 19^oE 23^oE 27^oE

56^oS

49^oS

42^oS

35^oS

28^oS

50 cm/s