-6

-5

-4

-3

-2

-1

0

Depth (km)

0 5 10 15 20 SST (^oC) np9603, section (m), 35-95 m

89^oE 90^oE 91^oE 92^oE 93^oE 94^oE

68^oS

67^oS

66^oS

65^oS

64^oS

63^oS

62^oS

50 cm/s